plant_plotter.c

M0 Ch0

VAR/4.99K

M1 Ch0

49.9K

M2 Ch0

499K

M3 Ch0

2.21M

M0 Ch1

VAR/4.99K

M1 Ch1

49.9K

M2 Ch1

499K

M3 Ch1

2.21M

M0 Ch2

VAR/4.99K

M1 Ch2

49.9K

M2 Ch2

499K

M3 Ch2

2.21M

M0 Ch3

VAR/4.99K

M1 Ch3

49.9K

M2 Ch3

499K

M3 Ch3

2.21M